Sheet1

Number sq. ft. total questions

Staff Space

Staff 120 85 10200 8x10

Staff (students) 35 68 2380 8x8

Student Staff 0 39 0 6x6

Files/Shelves 115 9 1035

Unique Team Spaces

Machine Room 1 1500 1500

Machine Storage 1 500 500

NOC 1 300 300

Test Cluster 1 300 300

Common Areas

Reception 1 470 470

Cyber bar 1 200 200

Training Room 1 480 480 combine?

Visitors Center 1 725 725 combine?

Conference Rooms 0

Small (4 person) 10 120 1200

Med. (6 person) 0 170 0

Large (8 person) 0 200 0

Team Room 7 400 2800 large - combine?

Whiteboard Alcove 5 18 90

Library 1 200 200 combine?

Secure Storage 2 105 210

Staging/Testing 2 150 300

Couch area 1 135 135

Kitchenette 1 65 65

Lunch Table 1 140 140 seems small

Courtyard 1 0 0 outside building

Mail Room 1 65 65 assume part of copy/fax?

Copy/Fax room 3 110 330

Bike parking 1 300 300

Central Stair 2 300 600

Base Building

Elevator hoistway 3 90 270

Elevator Machine 1 70 70

Building distribution 1 300 300

Tel/Data room 2 45 90

HVAC equip room 3 150 450 toilet basement 1 425 425 toilet other floors 2 490 980 loading dock 1 150 150 transformer room 1 0 0 750 outside building

Circulation Factor 1.45

Usable Area needed 39527

Available Area 26031

Sheet1

Program Overrun 51.85%