x.primes-2.ll.Ox test 135 +RTS -hb 187,778,218 bytes x seconds Tue Feb 17 18:51 2004

seconds

0.0 20.0 40.0 60.0 80.0 100.0 bytes

0k 200k

400k

600k

800k

1,000k

1,200k

1,400k

1,600k

1,800k

2,000k

2,200k

INHERENT_USE

LAG

USE